pgh1-gw

pgh2-gw

pgh3-gw mdvl1-gw phl1-gw

ts-phl

phl3-gw

PREPnet

August 1991

ftp.prepnet.com: /prepnet/maps/topology_map_xxxxxx.ps

Legend T1

56K

9.6

Planned

Proteon

cisco

Planned cisco

non-PREPnet

equipment hsbg1-gw hsbg2-gw

Token

Ring

Ethernet sei-gw gateway.

cert.sei.

cmu.edu

gateway.

sei.cmu.

edu

cmu-gw

PSC-GW3

psc-gw ussteel-gw altw2-gw

altw1-gw lehigh-gw

lafyte-gw

morav-gw upenn-gw

drexel-gw

temple-gw tju-gw jvnc-gw.

upenn.edu extern-gw.

upenn.edu

To

JvNCnet

phl2-gw

susqu-gw westch-gw widener-gw

batl-gw dacomp-gw

sswitch-gw

unisys-gw

UPghRTR

gw.pitt.edu

pitt-gw transarc-

gw incsys-gw

tartan-gw

asri-gw pinecrk-gw

iup-gw

maya-gw usbom-gw

129.250.1.

3

2

129.250.3.

2 1 3

4

2

129.250.19.

1

129.250.2.

1.57

6

129.250.45.

1

2

1

7

192.58.107.

3

1

129.250.22.

2

1

192.88.209.

254

2

128.2. (CMU Spine)

128.237.

254.254

1.128

1.2

1.1

3

2

1

129.250.9.

129.250.23.

2

1

192.5.39.

2

129.250.10.

2

1

7

NSS #5

To

NSFNET

254 To

NSFNET

T3 NSS

253

192.5.146.

8

192.31.230.

10

129.250.24.

2

1

192.54.226.

3

129.250.8.

2

1

136.142.

1.1

130.49.

1.1

1.59

129.250.11.

2

1

129.250.40.

2

1

192.88.188.

1

129.250.39.

1

2

144.80.

128.1

64.1

129.250.33.

1

2

192.70.254.

1

192.76.184.

2

VISUS

129.250.35.

2

1

137.227.

2.1

129.250.37.

2

1

192.5.7.

100

129.250.36.

1 duq-gw 2

192.88.240.

1

129.250.25.

2

1

192.5.56.

253

129.250.7.

2

1

129.250.18.

1

2

129.250.14.

2

1

129.250.31.

2

1

129.250.42.

2

1

128.180.

20.2

139.147.

8.1

192.31.90.

3

129.250.6.

2

1

129.250.4.

2

1

129.250.5.

1

2

129.32.

16.1

129.25.

1.253

192.84.2.

2 1 stcol-gw

hrb-gw

PSU campus

129.250.46.

129.250.12.

129.250.13.

2

1

To

JvNCnet

2

128.118.

146.186.

1.20

192.5.158.

1

2

2

1

192.68.227.

2

10

DDD 100Devon Syst.

101swarth-gw

Bryn Mawr Haverford

130.58.

64.10

2

1

129.250.16.

129.250.27.

2

1

144.26.

1.1

129.250.34.

2

1

192.55.239.

9

129.250.26.

2

1

192.65.202.

10

129.250.29.

2

1

192.80.11.

9

129.250.43.

2

1

147.140.

128.1

129.250.17.

2

1

128.126.

10.2

129.250.30.

140.108.

2 1

1.2

129.250.32.

1 villa-gw 2

192.82.109.

98

2

2

130.91.

244.1 sctn1-gw

sctn2-gw wilkes-gw

buck-gw

2

129.250.20.

2

1

129.250.41.

192.70.186.

2

1

146.94.

2.2

129.250.28.

2

1

134.82.

1.3

1 usctn-gw

129.250.21.

2

134.198.

15.254

129.250.38.

1

1 hslc-gw 2

192.100.94.

5

129.250.47.

Phl DNCC

(PCRoute)

LaSalle

(PCRoute)

6

129.250.160.

1 2

10.200

139.84.

10.210

10.201

ICDD 102

muhlen-gw

129.250.48.

2

1

192.104.181.

1 wea-gw

129.250.53.

2

1

192.112.68.

4