Arch Maarten van Gelder © 1992 Aug

This arch is constructed of several types of units folded from A4 laserwriter/copy paper.

1     Number/type of units used
           8   B  (bearing: in 4 flower baskets at bottom)
          16   H  (half height)
         168   A  (first designed)
         344   S  (strip)
          20   D  (cap; Dutch: dop)
          20   F  (foot)
          50   W  (wall)
       ----- +
         626  sheets A4 total