D Di i a a g gr ra a m m m m e ed d b by y J J. .C C . . N N o ol l a a n n - - F Fe eb b . . ’ ’ 9 9 5 5

Wh ite Ib is

(Eudo cimus albus) by GabrielWillow(ME)

High- Intermediate Startwith a whitebirdbasefolded fromr edpaper. A10" piece ofpaper producesa model 5" in length.

1. Reversefold

the two poi nts.

4. Reversefoldthe points. 5. Notethateach point

forms an isosclestri angle.

Fold the model in half and

rotate 90degrees.

7.Cr imp the legs forward so that

theyar e paral lel tothe frontof the

body.

8. Carefully slidethepaperback

as far asitwill goon both si des of

bothlegs.

9. Fold thecolored flapsi nside.

Note thatpart of the leg will still

bewhite.Repeatbehind.

11.Crimp the neckat 1/4.

6. Fold the flaps insideeachl eg.

12.Carefull y pulltheflaps down. 13.Crimp/sink the point.See

step14 for correct positioning.

14. Fold the flapsinside.

10.F oldboth flapsinside.

2.F oldthefront

pointdown.

3. Fold the

edges inward.

15. Crease the tail. 16. Fold inside.

17.Reverse fold. 18. Fold both flaps inside. 19.Shape thelegs.

20. Crim p theneckwhile thinning. 21.Shape thebottom & crimp again. 22. Fold the flapsinside.

23. Soften intofinalshape. 24. Completed model.