TAMPERE AREA IP NETWORKS

128.128.214.31 (TTKK) 128.214.41 (TTKK)

128.214.1 (TTKK) H 128.214.42 (TTKK)

H 192.26.104 (TTKK)

B

130.188 (VTT)

ESPOO

128.214.15 (TTKK/PORI) 128.214.39 (PTOL)

C 128.214.2 ,26,49 (TAY)

128.214.40 (TAMPERE)

19Kb

2Mb

fiber C

serial line

Cisco router F B H

FDDI bridge Remote bridge Host

H 9.6Kb

B 128.214.47 (Prodax) B

131.177 (PTL)

64Kb

F F

F 128.214.51 (TTKK) B

Ethernet

128.214.10 (TAYKS)

C

C

C

C

Digipak

H 128.214.54,55 (TAY)

B

B