-- --

IEEE P1003.2 Draft 11.2 - September 1991

Copyright � 1991 by the Institute of Electrical and Electronics Engineers, Inc. 345 East 47th Street New York, NY 10017, USA All rights reserved as an unpublished work.

This is an unapproved and unpublished IEEE Standards Draft, subject to change. The publication, distribution, or copying of this draft, as well as all derivative works based on this draft, is expressly prohibited except as set forth below.

Permission is hereby granted for IEEE Standards Committee participants to reproduce this document for purposes of IEEE standardization activities only, and subject to the restrictions contained herein.

Permission is hereby also granted for member bodies and technical committees of ISO and IEC to reproduce this document for purposes of developing a national position, subject to the restrictions contained herein.

Permission is hereby also granted to the preceding entities to make limited copies of this document in an electronic form only for the stated activities.

The following restrictions apply to reproducing or transmitting the document in any form: 1) all copies or portions thereof must identify the document’s IEEE project number and draft number, and must be accompanied by this entire notice in a prominent location; 2) no portion of this document may be redistributed in any modified or abridged form without the prior approval of the IEEE Standards Department.

Other entities seeking permission to reproduce this document, or any portion thereof, for standardization or other activities, must contact the IEEE Standards Department for the appropriate license.

Use of information contained in this unapproved draft is at your own risk.

IEEE Standards Department Copyright and Permissions 445 Hoes Lane, P.O. Box 1331 Piscataway, NJ 08855-1331, USA +1 (908) 562-3800 +1 (908) 562-1571 [FAX]

-- --

P1003.2/D11.2

Inform ation technology — P ortable Operating System Interface (P OSIX ) — P art 2: Shell and Utilities

Section 1: General

1 1.1 Scope

2 This standard defines a standard source code level interface to command interpre- 3 tation, or ‘‘shell,’’services and common utility programs for application programs. 4 These services and programs are complementary to those specified by ISO/IEC 5 9945-1: 1990 {8},hereinafter referred to as ‘‘POSIX .1 {8}.’’

6 The standard has been designed to be used by both application programmers and 7 system implementors. However, it is intended to be a reference document and not 8 a tutorial on the use of the services, the utilities, or the interrelationships 9 between the utilities.

10 The emphasis of this standard is on the shell and utility functionality required by 11 application programs (including ‘‘shell scripts’’) and not on the direct interactive 12 use of the shell command language or the utilities by humans.

13 Portions of this standard comprise optional language bindings to system service 14 interfaces. See, for example, the C Language Bindings Option in Annex B. This 15 standard is intended to describe language interfaces and utilities in sufficient 16 detail so that an application developer can understand the required interfaces 17 without access to the source code of existing implementations on which they may 18 be based. Therefore, it does not attempt to describe the source programming 19 language or internal design of the utilities; they should be considered ‘‘black 20 boxes’’ that exhibit the described functionality.

Copyright � 1991 IEEE. All rights reserved. This is an unapproved IEEE Standards Draft, subject to change.

1.1 Scope 1