-- --

IEEE P1003.0 Draft 13 - September 1991

Copyright � 1991 by the Institute of Electrical and Electronics Engineers, Inc. 345 East 47th Street New York, NY 10017, USA All rights reserved as an unpublished work.

This is an unapproved and unpublished IEEE Standards Draft, subject to change. The publication, distribution, or copying of this draft, as well as all derivative works based on this draft, is expressly prohibited except as set forth below.

Permission is hereby granted for IEEE Standards Committee participants to reproduce this document for purposes of IEEE standardization activities only, and subject to the restrictions contained herein.

Permission is hereby also granted for member bodies and technical committees of ISO and IEC to reproduce this document for purposes of developing a national position, subject to the restrictions contained herein.

Permission is hereby also granted to the preceding entities to make limited copies of this document in an electronic form only for the stated activities.

The following restrictions apply to reproducing or transmitting the document in any form: 1) all copies or portions thereof must identify the document’s IEEE project number and draft number, and must be accompanied by this entire notice in a prominent location; 2) no portion of this document may be redistributed in any modified or abridged form without the prior approval of the IEEE Standards Department.

Other entities seeking permission to reproduce this document, or any portion thereof, for standardization or other activities, must contact the IEEE Standards Department for the appropriate license.

Use of information contained in this unapproved draft is at your own risk.

IEEE Standards Department Copyright and Permissions 445 Hoes Lane, P.O. Box 1331 Piscataway, NJ 08855-1331, USA +1 (908) 562-3800 +1 (908) 562-1571 [FAX]

-- --

ENVIRONMENT INTERIM DOCUMENT P1003.0/D13

47 1.3 Conformance 48 Not applicable. D

Copyright � 1991 IEEE. All rights reserved. This is an unapproved IEEE Standards Draft, subject to change.

1.3 Conformance 3

P1003.0/D13

Section 2: Term inology and General Requirem ents

1 Responsibility: John Williams

2 2.1 Conventions

3 This guide uses the following typographic conventions:

4 — The italic font is used for cross references to defined terms within 1.3, 2.2.1, 5 and 2.2.2. D 6 In some cases tabular information is presented ‘‘inline;’’ in others it is presented 7 in a separately labeled Table. This arrangement was employed purely for ease of 8 typesetting and there is no normative difference between these two cases.

9 The typographic conventions listed above are for ease of reading only. Editorial 10 inconsistencies in the use of typography are unintentional and have no normative 11 meaning in this guide.

12 NOTE s provided as parts of labeled Tables and Figures are integral parts of this 13 guide (normative). Footnotes and NOTE s within the body of the text are for infor- 14 mation only (nonnormative).

15 2.2 Definitions

16 2.2.1 Terminology

17 For the purposes of this guide, the following definitions apply:

18 2.2.1.1 implementation defined: An indication that the implementation shall 19 define and document the requirements for correct program constructs and correct 20 data of a value or behavior.

21 2.2.1.2 informative: Providing or disclosing information; instructive. D

22 Used in standards to indicate a portion of the text that poses no requirements; the D 23 opposite of normative . D

Copyright � 1991 IEEE. All rights reserved. This is an unapproved IEEE Standards Draft, subject to change.

2.2 Definitions 5