31 January 1990 � SWITCH/tl

European IP Connectivity WIN

128.121

130.208 129.142

192.36.125 128.214

128.39

192.36.148

165.3 250 6.202

23 22 21

6.16

24

129

20

66 65 130

54.76

130.186

1.74 1

2

131.154.200

192.12.192

1

192.52.232

1

2

10

1.0.28

192.33.170

131.169

192.65.184

17

9

130.59

130.59.

79

1 2

72.1

131.196

1.60

1.11

192.65.185

130

130.59.92

2

1

192.54.104

49 50

30 4 1

128.112

192.16.192

26

128.93

192.44.64

36.128

9

96

200.10

128.141

41

129.217

2.2

49

72.2 84.2

192.16.183

192.16.190

2

1

130.59.91

32

192.48.96

134.158

49 65

128.92

250

192.5.60

26

1 2 1

33

192.12.54

1

192.54.168

1

192.36.148

130.251