CP309 PS352 C313 C382 CFlx8 RCF8 CP352 RCF9 C383 RCF10 RCF11 0.0 0.5 1.0 1.5 2.0 2.5 3.0 3.5 4.0 4.5 5.0 5.5 6.0 Relative Stiffness and Relative Weight ofSport Kite Spars

0.0 0.5 1.0 1.5 2.0 2.5 3.0 3.5 4.0 4.5 5.0 5.5 6.0

. . . . . . . . .

. .

(Stiffness) - (Weight)

Copyright 1993, Smooth Winds

Stiffness Weight

Reference Spar K75 (8.7/7.0 mm glassfibre tube, 33 g/m)

Note: the scale ofverticalaxis is different than in other charts.