AFC1580 AFC1700 AFC1800 BeSPL13 AFC1880 AFC1960 BePRO13 RBJ5.5 BeSPL14 PS278 C252 ADV/2 AFC2200 BePRO14 BeSPL15 A/C3-30 CP278

0.0

0.5

1.0

1.5 Relative Stiffness and Relative Weight ofSport Kite Spars

0.0

0.5

1.0

1.5

. . . . . . . . . . . . . . . . .

(Stiffness) - (Weight)

Copyright 1993, Smooth Winds

Stiffness Weight

Reference Spar K75 (8.7/7.0 mm glassfibre tube, 33 g/m)